0 20 40 60 80

-like γN 0 20 40 60 80

-true γN

6−10

5−10

4−10

3−10

2−10

1−10

)_{-like} γN|_{-true} γN P (

ALICE Simulation

= 5.02 TeV s pp,

< 3.9 labη

2.3 <

PYTHIA 8 Monash 2013

> 2 cell N ADC > 9 MPV,

ALI-PUB-562171

ALI-PUB-562171